)c (GeV/ Tp 1 10^210

Bf

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 = 5.02 TeV NNs < 0, ψJ/y

ATLAS, p-Pb -1.94 < = 7 TeV s | < 0.9, ψJ/y

ALICE, pp | = 7 TeV s | < 0.9, ψJ/y

CMS, pp | = 7 TeV s | < 0.25, ψJ/y

ATLAS, pp | = 8 TeV s | < 0.25, ψJ/y

ATLAS, pp | = 1.96 TeV s | < 0.6, ψJ/y |p

CDF, p

= 5.02 TeV NNs < 0.43, ψJ/y

ALICE, p-Pb -1.37 <

95%CL